ALTER TABLE `weighing_management` 
MODIFY COLUMN `secretary_weigher` varchar(50) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '毛检员' AFTER `storage_number`,
ADD COLUMN `skin_inspector` varchar(50) NULL COMMENT '皮检员' AFTER `secretary_weigher`;